05101520253042.0

38.0

34.0

11:45:30.0

52:00.0

30.0

-6:53:00.0

54:00.0

55:00.0

RA (J2000)

Dec (J2000)

OBSID 00723124000 / DATE-OBS 2016-11-21T02:19:49.0

UVOT Finding Chart