024681028.0

24.0

19:58:20.0

16.0

13:00.0

30.0

35:12:00.0

11:00.0

10:30.0

RA (J2000)

Dec (J2000)

OBSID 00723539000 / DATE-OBS 2016-11-23T13:39:31.1

UVOT Finding Chart