01234567891021:04:50.0

46.0

42.0

30.0

08:00.0

32:07:00.0

06:00.0

RA (J2000)

Dec (J2000)

OBSID 00724438000 / DATE-OBS 2016-11-29T07:16:55.5

UVOT Finding Chart