010203040506058.0

54.0

19:57:50.0

46.0

11:00.0

30.0

35:10:00.0

09:00.0

08:00.0

RA (J2000)

Dec (J2000)

OBSID 00725626000 / DATE-OBS 2016-12-06T08:10:55.8

UVOT Finding Chart