0246810127:59:30.0

26.0

22.0

48:00.0

30.0

49:00.0

-38:50:00.0

RA (J2000)

Dec (J2000)

OBSID 00727422000 / DATE-OBS 2016-12-19T07:37:27.6

UVOT Finding Chart