05101520256:07:00.0

56.0

52.0

06:48.0

46:00.0

30.0

47:00.0

-26:48:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00727541000 / DATE-OBS 2016-12-19T18:50:48.1

UVOT Finding Chart