0246810121416182012.0

06.0

21:43:00.0

30.0

26:00.0

43:25:00.0

24:00.0

23:30.0

RA (J2000)

Dec (J2000)

OBSID 00730513000 / DATE-OBS 2017-01-06T08:33:53.6

UVOT Finding Chart