0510152025303540451:01:00.0

56.0

52.0

00:48.0

-17:10:00.0

30.0

11:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 00732188000 / DATE-OBS 2017-01-12T02:03:25.5

UVOT Finding Chart