05101520254:07:00.0

50.0

40.0

06:30.0

55:30.0

56:00.0

30.0

-71:57:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00732526000 / DATE-OBS 2017-01-13T10:18:43.0

UVOT Finding Chart