010203040506030.0

17:34:20.0

10.0

44:00.0

30.0

-64:45:00.0

46:00.0

RA (J2000)

Dec (J2000)

OBSID 00735188000 / DATE-OBS 2017-01-26T11:32:31.1

UVOT Finding Chart