0123456736.0

11:37:30.0

24.0

18.0

49:00.0

30.0

-45:50:00.0

51:00.0

RA (J2000)

Dec (J2000)

OBSID 00735326000 / DATE-OBS 2017-01-27T14:35:53.7

UVOT Finding Chart