012345678924.0

11:06:20.0

16.0

12.0

45:30.0

46:00.0

30.0

-46:47:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 00737438000 / DATE-OBS 2017-02-08T18:17:11.9

UVOT Finding Chart