0246810121412:06:00.0

54.0

05:48.0

41:00.0

30.0

47:40:00.0

39:00.0

38:00.0

RA (J2000)

Dec (J2000)

OBSID 00738728000 / DATE-OBS 2017-02-16T19:24:35.6

UVOT Finding Chart