051015202530354050.0

15:22:40.0

30.0

43:00.0

-55:44:00.0

45:00.0

46:00.0

RA (J2000)

Dec (J2000)

OBSID 00739517000 / DATE-OBS 2017-02-22T02:49:14.3

UVOT Finding Chart