02040608010012014026.0

17:32:20.0

14.0

43:30.0

44:00.0

30.0

-44:45:00.0

46:00.0

RA (J2000)

Dec (J2000)

OBSID 00741220000 / DATE-OBS 2017-03-06T07:08:50.9

UVOT Finding Chart