0102030405048.0

44.0

20:22:40.0

36.0

26:00.0

30.0

28:25:00.0

24:00.0

23:00.0

RA (J2000)

Dec (J2000)

OBSID 00743065000 / DATE-OBS 2017-03-18T12:14:11.9

UVOT Finding Chart