5101520253035404514.0

21:35:10.0

06.0

23:30.0

24:00.0

30.0

-24:25:00.0

26:00.0

RA (J2000)

Dec (J2000)

OBSID 00744791000 / DATE-OBS 2017-03-31T01:43:12.7

UVOT Finding Chart