02468101238.0

34.0

12:19:30.0

26.0

41:00.0

30.0

5:40:00.0

39:00.0

38:00.0

RA (J2000)

Dec (J2000)

OBSID 00750096000 / DATE-OBS 2017-04-26T22:46:37.5

UVOT Finding Chart