051015202512.0

08.0

04.0

12:31:00.0

-7:57:00.0

30.0

58:00.0

59:00.0

-8:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00750337000 / DATE-OBS 2017-04-28T15:05:31.3

UVOT Finding Chart