02468101214162:46:20.0

10.0

53:00.0

30.0

-55:54:00.0

55:00.0

56:00.0

RA (J2000)

Dec (J2000)

OBSID 00753110000 / DATE-OBS 2017-05-16T12:54:38.9

UVOT Finding Chart