0510152025303540455021:18:00.0

56.0

52.0

48.0

17:44.0

30.0

36:00.0

48:35:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00754322000 / DATE-OBS 2017-05-24T19:50:41.4

UVOT Finding Chart