02468101214161858.0

54.0

21:17:50.0

46.0

42.0

30.0

36:00.0

48:35:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00754322000 / DATE-OBS 2017-05-24T19:54:13.6

UVOT Finding Chart