0246810121434.0

0:29:30.0

26.0

16:00.0

30.0

9:15:00.0

14:00.0

13:30.0

RA (J2000)

Dec (J2000)

OBSID 00756284000 / DATE-OBS 2017-06-07T23:26:48.3

UVOT Finding Chart