02468101214161817:31:00.0

56.0

52.0

30:48.0

-5:57:00.0

30.0

58:00.0

59:00.0

-6:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00756953000 / DATE-OBS 2017-06-12T21:09:51.6

UVOT Finding Chart