0.51.52.58:40:00.0

56.0

52.0

39:48.0

33:00.0

30.0

-46:34:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00759159000 / DATE-OBS 2017-06-29T12:55:19.1

UVOT Finding Chart