0510152025303524.0

15:27:20.0

16.0

12.0

08.0

27:30.0

28:00.0

30.0

29:00.0

-38:30:00.0

RA (J2000)

Dec (J2000)

OBSID 00761119000 / DATE-OBS 2017-07-10T00:48:15.9

UVOT Finding Chart