0102030405034.0

18:17:30.0

26.0

22.0

41:30.0

42:00.0

30.0

-16:43:00.0

44:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 00765081000 / DATE-OBS 2017-07-28T16:59:47.5

UVOT Finding Chart