051015202554.0

11:39:50.0

46.0

42.0

17:00.0

30.0

18:00.0

19:00.0

-16:20:00.0

RA (J2000)

Dec (J2000)

OBSID 00766081000 / DATE-OBS 2017-08-03T17:35:46.9

UVOT Finding Chart