0.0005

0.001

0.0015

0.002

0.0025

44.0

18:24:40.0

36.0

32.0

28.0

11:00.0

30.0

-40:12:00.0

13:00.0

14:00.0

RA (J2000)

Dec (J2000)

OBSID 00769567000 / DATE-OBS 2017-08-27T05:17:39.8

UVOT Finding Chart