0510152006.0

16:58:00.0

57:54.0

30.0

35:00:00.0

59:00.0

34:58:00.0

57:30.0

RA (J2000)

Dec (J2000)

OBSID 00770528000 / DATE-OBS 2017-09-03T13:47:30.6

UVOT Finding Chart