010203040506056.0

13:35:50.0

44.0

38.0

04:30.0

05:00.0

30.0

-47:06:00.0

07:00.0

RA (J2000)

Dec (J2000)

OBSID 00770957000 / DATE-OBS 2017-09-06T00:44:48.5

UVOT Finding Chart