0510152025303515:29:00.0

56.0

52.0

48.0

28:44.0

13:30.0

14:00.0

30.0

-28:15:00.0

16:00.0

RA (J2000)

Dec (J2000)

OBSID 00770958000 / DATE-OBS 2017-09-06T00:57:26.2

UVOT Finding Chart