0102030405060708014:22:00.0

50.0

21:40.0

58:30.0

-61:59:00.0

30.0

-62:00:00.0

01:00.0

RA (J2000)

Dec (J2000)

OBSID 00772052000 / DATE-OBS 2017-09-12T06:48:42.8

UVOT Finding Chart