0510152012.0

06.0

23:10:00.0

37:30.0

38:00.0

30.0

39:00.0

-41:40:00.0

RA (J2000)

Dec (J2000)

OBSID 00773900000 / DATE-OBS 2017-09-24T11:14:25.8

UVOT Finding Chart