024681012141618202250.0

45.0

9:16:40.0

35.0

30.0

43:00.0

42:00.0

41:00.0

52:40:00.0

RA (J2000)

Dec (J2000)

OBSID 00776347000 / DATE-OBS 2017-10-04T07:58:56.4

UVOT Finding Chart