02468101232.0

26.0

9:02:20.0

51:00.0

30.0

42:50:00.0

49:00.0

48:00.0

47:30.0

RA (J2000)

Dec (J2000)

OBSID 00777215000 / DATE-OBS 2017-10-07T12:02:48.7

UVOT Finding Chart