051015202510.0

05.0

5:14:00.0

55.0

13:50.0

24:00.0

30.0

62:23:00.0

22:00.0

RA (J2000)

Dec (J2000)

OBSID 00779171000 / DATE-OBS 2017-10-15T19:16:23.1

UVOT Finding Chart