051015202512.0

08.0

04.0

9:02:00.0

31:30.0

32:00.0

30.0

-40:33:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00779762000 / DATE-OBS 2017-10-17T17:52:55.0

UVOT Finding Chart