024681012141650.0

2:43:40.0

30.0

28:00.0

27:00.0

61:26:00.0

25:00.0

24:30.0

RA (J2000)

Dec (J2000)

OBSID 00782859000 / DATE-OBS 2017-10-26T03:26:36.1

UVOT Finding Chart