012345654.0

4:06:50.0

46.0

42.0

36:00.0

30.0

-2:37:00.0

38:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00783479000 / DATE-OBS 2017-10-27T08:37:49.9

UVOT Finding Chart