012345678910.0

2:44:00.0

43:50.0

30.0

61:40:00.0

39:00.0

38:00.0

37:30.0

RA (J2000)

Dec (J2000)

OBSID 00784158000 / DATE-OBS 2017-10-29T19:29:10.8

UVOT Finding Chart