0510152025303540455044.0

9:17:40.0

36.0

32.0

-30:30:00.0

30.0

31:00.0

32:00.0

33:00.0

RA (J2000)

Dec (J2000)

OBSID 00796100000 / DATE-OBS 2017-12-09T14:48:23.6

UVOT Finding Chart