01234567844.0

19:35:40.0

36.0

37:00.0

30.0

20:36:00.0

35:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00796778000 / DATE-OBS 2017-12-12T12:01:59.0

UVOT Finding Chart