0102030405018.0

12.0

06.0

14:08:00.0

28:00.0

30.0

29:00.0

-50:30:00.0

31:00.0

RA (J2000)

Dec (J2000)

OBSID 00797441000 / DATE-OBS 2017-12-16T03:21:40.0

UVOT Finding Chart