0.51.52.53.54.55.516.0

12.0

08.0

04.0

9:53:00.0

39:00.0

30.0

35:38:00.0

37:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 00799669000 / DATE-OBS 2017-12-22T16:28:15.5

UVOT Finding Chart