0246810121412.0

08.0

04.0

9:59:00.0

30.0

17:00.0

48:16:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 00804692000 / DATE-OBS 2018-01-11T16:47:36.2

UVOT Finding Chart