01234567814.0

0:48:10.0

06.0

36:30.0

37:00.0

30.0

-15:38:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00805318000 / DATE-OBS 2018-01-15T04:21:22.7

UVOT Finding Chart