0102030405034.0

22:00:30.0

26.0

22.0

52:00.0

30.0

51:00.0

30:50:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00808483000 / DATE-OBS 2018-02-04T02:38:09.2

UVOT Finding Chart