510152025303504.0

19:59:00.0

58:56.0

03:00.0

30.0

35:02:00.0

01:00.0

RA (J2000)

Dec (J2000)

OBSID 00809374000 / DATE-OBS 2018-02-10T00:16:33.4

UVOT Finding Chart