051015202530354045505524.0

17:06:20.0

16.0

12.0

46:30.0

47:00.0

30.0

48:00.0

49:00.0

-36:50:00.0

RA (J2000)

Dec (J2000)

OBSID 00811235000 / DATE-OBS 2018-02-22T13:11:46.6

UVOT Finding Chart